# mysql -u <USER> -p mymontools <initial_trap_config.sql

INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.6.3.1.1.5.1','SNMPv2-MIB::coldStart','System/SNMP','INFO');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.6.3.1.1.5.2','SNMPv2-MIB::warmStart','System/SNMP','INFO');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.6.3.1.1.5.3','IF-MIB::linkDown','Network/Link','WARNING');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.6.3.1.1.5.4','IF-MIB::linkUp','Network/Link','OK');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.6.3.1.1.5.5','SNMPv2-MIB::authenticationFailure','System/Auth','WARNING');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.2.1.17.0.1','BRIDGE-MIB::newRoot','Network/Bridge','WARNING');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.2.1.17.0.2','BRIDGE-MIB::topologyChange','Network/Bridge','OK');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.1','PowerNet-MIB::communicationLost','USV/System','CRITICAL');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.2','PowerNet-MIB::upsOverload','USV/Power','CRITICAL');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.3','PowerNet-MIB::upsDiagnosticsFailed','USV/System','CRITICAL');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.4','PowerNet-MIB::upsDischarged','USV/Power','CRITICAL');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.5','PowerNet-MIB::upsOnBattery','USV/Power','WARNING');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.6','PowerNet-MIB::smartBoostOn','USV/Power','WARNING');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.7','PowerNet-MIB::lowBattery','USV/Power','CRITICAL');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.8','PowerNet-MIB::communicationEstablished','USV/System','OK');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.9','PowerNet-MIB::powerRestored','USV/Power','OK');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.10','PowerNet-MIB::upsDiagnosticsPassed','USV/System','OK');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.11','PowerNet-MIB::returnFromLowBattery','USV/Power','OK');
INSERT INTO `traps_cfgtrap` (`trapoid`, `trapname`, `category`, `severity`) VALUES ('.1.3.6.1.4.1.318.0.17','PowerNet-MIB::upsBatteryNeedsReplacement','USV/Power','CRITICAL');

