INSERT INTO `states_cfgstate` (`id`, `name`, `sub_varbind`) VALUES (1,'linkDown','.1.3.6.1.2.1.2.2.1.1.');
INSERT INTO `states_cfgstate` (`id`, `name`, `sub_varbind`) VALUES (2,'upsOnBattery',NULL);
INSERT INTO `states_cfgstate` (`id`, `name`, `sub_varbind`) VALUES (3,'smartBoostOn',NULL);

INSERT INTO `states_cfgstatestartevent` (`id`, `trapoid`, `state_id`) VALUES (1,'.1.3.6.1.6.3.1.1.5.3',1);
INSERT INTO `states_cfgstatestartevent` (`id`, `trapoid`, `state_id`) VALUES (2,'.1.3.6.1.4.1.318.0.5',2);
INSERT INTO `states_cfgstatestartevent` (`id`, `trapoid`, `state_id`) VALUES (3,'.1.3.6.1.4.1.318.0.6',3);

INSERT INTO `states_cfgstatestopevent` (`id`, `trapoid`, `state_id`) VALUES (1,'.1.3.6.1.6.3.1.1.5.4',1);
INSERT INTO `states_cfgstatestopevent` (`id`, `trapoid`, `state_id`) VALUES (2,'.1.3.6.1.4.1.318.0.9',2);
INSERT INTO `states_cfgstatestopevent` (`id`, `trapoid`, `state_id`) VALUES (3,'.1.3.6.1.4.1.318.0.34',3);

